η 2- 1- 0 1 2

〉η/d_{ch}Nd〈

5

6

7

8

9

= 13 TeV s pp,

ALICE (INEL>0) ALICE (INEL) CMS (INEL)

EPOS LHC PYTHIA 8 (Monash-2013) PYTHIA 6 (Perugia-2011)

= 13 TeV s pp,